Time (s)

0 0.153211

–0.175

0.1092 0

Frequency (Hz)

0 3000

Sound pressure level (dB/Hz)

0

20

40

0 3000

8.157

64.52

Mels

FFT + LPC smoothed spectrum (linear)

Mel filter + Cepstral smoothed spectrum

/e/ from “kasteel”